=== BEST-OF-RUN ===
              generation: 0
                   nodes: 15
                   depth: 5
                    hits: 525
TOP INDIVIDUAL:



-- #1 --
                    hits: 525
             raw fitness: 525.0000
    standardized fitness: 525.0000
        adjusted fitness: 0.9981
TREE:
 (- (+ area perimeter) eccentricity)
TREE-equ:
y = ((area + perimeter) - eccentricity)
