=== BEST-OF-RUN ===
              generation: 12
                   nodes: 6
                   depth: 4
                    hits: 910
TOP INDIVIDUAL:



-- #1 --
                    hits: 910
             raw fitness: 910.0000
    standardized fitness: 910.0000
        adjusted fitness: 0.9989
TREE:
 (log (+ (log (log perimeter)) -0.81321))
TREE-equ:
y = log((log(log(perimeter)) + -0.81321))
