=== BEST-OF-RUN ===
              generation: 0
                   nodes: 6
                   depth: 2
                    hits: 741
TOP INDIVIDUAL:



-- #1 --
                    hits: 741
             raw fitness: 741.0000
    standardized fitness: 741.0000
        adjusted fitness: 0.9987
TREE:
 (/ (+ -0.87639 eccentricity)
    (exp perimeter))
TREE-equ:
y = ((-0.87639 + eccentricity) / exp(perimeter))
