=== BEST-OF-RUN ===
              generation: 3
                   nodes: 3
                   depth: 1
                    hits: 779
TOP INDIVIDUAL:



-- #1 --
                    hits: 779
             raw fitness: 779.0000
    standardized fitness: 779.0000
        adjusted fitness: 0.9987
TREE:
 (- eccentricity 0.89000)
TREE-equ:
y = (eccentricity - 0.89000)
