=== BEST-OF-RUN ===
              generation: 27
                   nodes: 6
                   depth: 3
                    hits: 723
TOP INDIVIDUAL:



-- #1 --
                    hits: 723
             raw fitness: 723.0000
    standardized fitness: 723.0000
        adjusted fitness: 0.9986
TREE:
 (+ (+ (log eccentricity) eccentricity) -0.74410)
TREE-equ:
y = ((log(eccentricity) + eccentricity) + -0.74410)
