=== BEST-OF-RUN ===
              generation: 10
                   nodes: 4
                   depth: 2
                    hits: 804
TOP INDIVIDUAL:



-- #1 --
                    hits: 804
             raw fitness: 804.0000
    standardized fitness: 804.0000
        adjusted fitness: 0.9988
TREE:
 (log (+ 0.11137 eccentricity))
TREE-equ:
y = log((0.11137 + eccentricity))
