=== BEST-OF-RUN ===
              generation: 32
                   nodes: 3
                   depth: 1
                    hits: 782
TOP INDIVIDUAL:



-- #1 --
                    hits: 782
             raw fitness: 782.0000
    standardized fitness: 782.0000
        adjusted fitness: 0.9987
TREE:
 (+ -0.88842 eccentricity)
TREE-equ:
y = (-0.88842 + eccentricity)
