=== BEST-OF-RUN ===
              generation: 16
                   nodes: 3
                   depth: 1
                    hits: 803
TOP INDIVIDUAL:



-- #1 --
                    hits: 803
             raw fitness: 803.0000
    standardized fitness: 803.0000
        adjusted fitness: 0.9988
TREE:
 (- eccentricity 0.89313)
TREE-equ:
y = (eccentricity - 0.89313)
