=== BEST-OF-RUN ===
              generation: 24
                   nodes: 7
                   depth: 3
                    hits: 789
TOP INDIVIDUAL:



-- #1 --
                    hits: 789
             raw fitness: 789.0000
    standardized fitness: 789.0000
        adjusted fitness: 0.9987
TREE:
 (+ (log (+ 0.23408 eccentricity))
    (log eccentricity))
TREE-equ:
y = (log((0.23408 + eccentricity)) + log(eccentricity))
