=== BEST-OF-RUN ===
              generation: 18
                   nodes: 5
                   depth: 3
                    hits: 783
TOP INDIVIDUAL:



-- #1 --
                    hits: 783
             raw fitness: 783.0000
    standardized fitness: 783.0000
        adjusted fitness: 0.9987
TREE:
 (log (- (log -0.89689) eccentricity))
TREE-equ:
y = log((log(-0.89689) - eccentricity))
