=== BEST-OF-RUN ===
              generation: 12
                   nodes: 9
                   depth: 4
                    hits: 786
TOP INDIVIDUAL:



-- #1 --
                    hits: 786
             raw fitness: 786.0000
    standardized fitness: 786.0000
        adjusted fitness: 0.9987
TREE:
 (log (+ eccentricity 0.10394))
TREE-equ:
y = log((eccentricity + 0.10394))
