=== BEST-OF-RUN ===
              generation: 1
                   nodes: 7
                   depth: 2
                    hits: 710
TOP INDIVIDUAL:



-- #1 --
                    hits: 710
             raw fitness: 710.0000
    standardized fitness: 710.0000
        adjusted fitness: 0.9986
TREE:
 (- (* eccentricity perimeter)
    (/ minor 0.22723))
TREE-equ:
y = ((eccentricity * perimeter) - (minor / 0.22723))
