=== BEST-OF-RUN ===
              generation: 8
                   nodes: 6
                   depth: 2
                    hits: 909
TOP INDIVIDUAL:



-- #1 --
                    hits: 909
             raw fitness: 909.0000
    standardized fitness: 909.0000
        adjusted fitness: 0.9989
TREE:
 (- (log eccentricity)
    (* convex -0.00001))
TREE-equ:
y = (log(eccentricity) - (convex * -0.00001))
