=== BEST-OF-RUN ===
              generation: 28
                   nodes: 6
                   depth: 3
                    hits: 921
TOP INDIVIDUAL:



-- #1 --
                    hits: 921
             raw fitness: 921.0000
    standardized fitness: 921.0000
        adjusted fitness: 0.9989
TREE:
 (- 0.05003
    (/ (log convex) major))
TREE-equ:
y = (0.05003 - (log(convex) / major))
